<template>
  <div>
    <crumbs title="电子病历页面方案配置" style="min-width: 980px">
      <el-form :inline="true" class="demo-form-inline">
        <el-form-item label="方案名称：">
          <el-input size="mini" v-model="filter.planName" placeholder="请输入" clearable></el-input>
        </el-form-item>
        <el-form-item>
          <el-button size="mini" @click="filterDatas">检索</el-button>
          <el-button size="mini" type="warning" @click="addRelation">添加方案</el-button>
        </el-form-item>
      </el-form>
    </crumbs>
    <div class="contents">
      <el-table :data="list" border style="width: 100%">
        <el-table-column :resizable="false" type="index" :index="indexMethod" label="编号" width="60"></el-table-column>
        <el-table-column :resizable="false" prop="hospitalName" label="医院名称" show-overflow-tooltip></el-table-column>
        <el-table-column :resizable="false" prop="hospitalId" label="医院编码"></el-table-column>
        <el-table-column :resizable="false" prop="planName" label="方案名称" show-overflow-tooltip></el-table-column>
        <el-table-column :resizable="false" prop="planCode" label="方案编码" width="180"></el-table-column>
        <el-table-column :resizable="false" prop="planDetail" label="模块配置" show-overflow-tooltip></el-table-column>
        <el-table-column
          :resizable="false"
          prop="gmtCreate"
          label="创建时间"
          show-overflow-tooltip
          width="180"
        ></el-table-column>
        <el-table-column
          :resizable="false"
          prop="planStatus"
          label="状态"
          show-overflow-tooltip
          width="180"
        >
          <template slot-scope="scope">{{scope.row.planStatus == 1 ? '已启用': '已禁用'}}</template>
        </el-table-column>

        <el-table-column :resizable="false" prop="operate" label="操作">
          <template slot-scope="scope">
            <el-button
              @click="modifyRelation(scope.row)"
              type="text"
              size="small"
              v-if="scope.row.planStatus === 1"
              class="disable"
            >修改</el-button>
            <el-button plain type="text" size="small" v-else disabled>修改</el-button>
            <span style="margin:0 3px;">|</span>
            <el-button
              type="text"
              size="small"
              class="delete"
              @click="enableOrAble(scope.row,0)"
              v-if="scope.row.planStatus === 1"
            >禁用</el-button>
            <el-button type="text" size="small" @click="enableOrAble(scope.row,1)" v-else>启用</el-button>
            <span style="margin:0 3px;">|</span>
            <el-button
              v-if="scope.row.planStatus !== 1"
              @click="showDelDialog(scope.row.id,scope.row.planStatus,scope.row.planName)"
              class="delete"
              type="text"
              size="small"
            >删除</el-button>
            <el-button plain type="text" size="small" v-else disabled>删除</el-button>
          </template>
        </el-table-column>
      </el-table>
      <div class="pagination">
        <el-pagination
          :current-page.sync="currentPage"
          @current-change="currentChange"
          background
          :page-size="pageSize"
          :page-sizes="pageSizeArr"
          @size-change="handleSizeChange"
          :layout="pageLayout"
          :total="total"
        ></el-pagination>
      </div>
    </div>
  </div>
</template>

<script>
import api from '@api/cdss.js';
import config from '@api/config.js';
import utils from '@api/utils.js';

export default {
  name: 'Plan',
  data: function() {
    return {
      list: [],
      searched: false,
      filter: {
        planName: '' //标准诊断名称
      },
      currentPage: 1,
      pageSize: config.pageSize,
      pageSizeArr: config.pageSizeArr,
      pageLayout: config.pageLayout,
      total: 0,
      hospitalId: ''
    };
  },
  created() {
    const that = this;
    //返回时避免参数未赋值就获取列表
    setTimeout(function() {
      that.getDataList();
    });
    // 非首页 编辑页返回 设置 this.currentPage
    if (Object.keys(this.$route.params).length !== 0) {
      this.currentPage = this.$route.params.currentPage;
    }
  },
  watch: {
    filter: {
      handler: function() {
        this.searched = false;
      },
      deep: true
    }
  },
  beforeRouteEnter(to, from, next) {
    next(vm => {
      //const pm = to.param;
      Object.assign(vm, to.params);
      vm.inCurrentPage = to.params.currentPage;
    });
  },
  methods: {
    handleSizeChange(val) {
      this.pageSize = val;
      this.currentPage = utils.getCurrentPage(
        this.currentPage,
        this.total,
        this.pageSize
      );
      this.getDataList();
    },

    // 获取列表数据
    async getDataList(isTurnPage) {
      let params = await this.getFilterItems(isTurnPage);
      this.searched = true;
      const loading = this.$loading({
        lock: true,
        text: 'Loading',
        spinner: 'el-icon-loading',
        background: 'rgba(0, 0, 0, 0.7)'
      });
      api.getPlanInfoPages(params).then(res => {
        loading.close();
        if (res.data.code === '0') {
          this.list = res.data.data && res.data.data.records;
        }
        this.total = res.data.data && res.data.data.total;
        if (this.inCurrentPage !== undefined) {
          this.currentPage = this.inCurrentPage;
          this.inCurrentPage = undefined;
        }
      });
    },

    // 处理列表请求数据参数
    async getFilterItems(isTurnPage) {
      //翻页时筛选条件没点确定则清空
      if (isTurnPage && !this.searched) {
        this.clearFilter();
      }
      // let res = await api.getHospitalInfo();
      // if (res.data.code === '0') {
      //   this.hospitalId = res.data.data.id;
      // }
      const param = {
        current: this.inCurrentPage || this.currentPage,
        size: this.pageSize,
        planName: this.filter.planName.trim()
        // hospitalId: res.data.data.id
      };
      return param;
    },

    filterDatas() {
      this.currentPage = 1;
      this.getDataList();
    },
    addRelation() {
      const pam = this.searched
        ? {
            currentPage: this.currentPage,
            pageSize: this.pageSize,
            filter: this.filter
          }
        : { currentPage: this.currentPage, pageSize: this.pageSize };
      this.$router.push({ name: 'AddPlan', params: pam });
    },
    // 修改诊断关联-跳转至编辑页面
    modifyRelation(row) {
      const item = Object.assign({}, row);
      const pam = this.searched
        ? {
            currentPage: this.currentPage,
            pageSize: this.pageSize,
            filter: this.filter
          }
        : { currentPage: this.currentPage, pageSize: this.pageSize };
      this.$router.push({
        name: 'AddPlan',
        params: Object.assign(pam, { isEdit: true, data: item })
      });
    },
    currentChange(next) {
      this.currentPage = next;
      this.getDataList(true);
      // if (this.cacheData[next]) {       //如果已请求过该页数据，则使用缓存不重复请求
      //     this.list = this.cacheData[next];
      // } else {
      //     this.getDataList();
      // }
    },
    // 清空搜索参数
    clearFilter() {
      this.filter = {
        hisName: '',
        planName: ''
      };
    },

    indexMethod(index) {
      return (this.currentPage - 1) * this.pageSize + index + 1;
    },
    getTagType(val) {
      return val;
    },
    warning(msg, type) {
      this.$message({
        showClose: true,
        message: msg,
        type: type || 'warning'
      });
    },
    showConfirmDialog(msg, resolve, type) {
      let showInfo = '启用';
      let btnNameClass = 'confirmBtn2';
      if (type === 'Del') {
        showInfo = '禁用';
        btnNameClass = 'delBtn';
      } else if (type === 'Del1') {
        showInfo = '删除';
        btnNameClass = 'delBtn';
      }

      this.$confirm(msg, '提示', {
        confirmButtonText: showInfo,
        cancelButtonText: '取消',
        cancelButtonClass: 'cancelBtn',
        confirmButtonClass: btnNameClass,
        type: 'warning'
      })
        .then(() => {
          resolve();
        })
        .catch(() => {});
    },
    // 获取医院信息
    _getHospital() {
      api.getHospitalInfo().then(res => {
        if (res.data.code === '0') {
          this.hospitalId = res.data.data.id;
        }
      });
    },
    // 删除关联
    showDelDialog(id, status, info) {
      if (status === 1) {
        this.$confirm(`${info}正在启用中，无法删除。`, '提示', {
          confirmButtonText: '确定',
          // cancelButtonText: '取消',
          cancelButtonClass: 'cancelSureL',
          confirmButtonClass: 'sureL',
          customClass: 'exportBoxL',
          type: 'warning'
        })
          .then(() => {})
          .catch(() => {});
        return false;
      }

      this.showConfirmDialog(
        '是否删除该方案配置？',
        () => {
          let params = {
            planId: id,
            hospitalId: this.hospitalId
          };
          api
            .cancelPlanDatas(params)
            .then(res => {
              if (res.data.code == '0') {
                if (!this.searched) {
                  //未点确认时清空搜索条件
                  this.clearFilter();
                }
                if (this.list.length == 1) {
                  //当前在最后一页且只有一条数据时，删除后跳到前一页
                  this.currentPage =
                    this.currentPage === 1 ? 1 : this.currentPage - 1;
                }
                this.getDataList();
                this.warning(res.data.msg || '操作成功', 'success');
              } else {
                this.warning(res.data.msg);
              }
            })
            .catch(error => {
              if (error.code === '900010001') {
                return false;
              }
              this.warning(error);
            });
        },
        'Del1'
      );
    },

    // 启用/禁用 数据请求
    sendAbleOrEn(row, type) {
      api
        .revStopPlans({
          id: row.id,
          status: type
        })
        .then(res => {
          if (res.data.code === '0') {
            this.$message({
              showClose: true,
              message: '操作成功',
              type: 'success',
              duration: 1000
            });
            this.getDataList();
          }
        })
        .catch(err => {});
    },

    // 启用/禁用
    enableOrAble(row, type) {
      // console.log('启用planName', row, type);
      if (type === 1) {
        // 启用
        this.showConfirmDialog(
          `确定要启用${row.planName}吗？`,
          () => {
            this.sendAbleOrEn(row, type);
          },
          'Reuse'
        );
      } else {
        // 禁用
        this.showConfirmDialog(
          `方案禁用后前端页面将无法正常显示内容，确定要禁用${row.planName}吗？`,
          () => {
            this.sendAbleOrEn(row, type);
          },
          'Del'
        );
      }
    }
  }
};
</script>


<style lang="less" scoped>
@import '../../../less/admin.less';
.delete {
  color: red;
}
.delete:hover {
  color: red;
}
.pagination {
  min-width: 1010px;
}
.disable {
  border-color: transparent;
}
.el-message-box {
  /deep/.cancelBtn {
    background-color: #d7d7d7;
    border-color: transparent;
  }
  /deep/ .delBtn {
    background-color: #ff545b !important;
    border-color: transparent !important;
  }
  /deep/ .confirmBtn2 {
    position: relative;
    right: 0px !important;
  }
}
.exportBoxL {
  /deep/ .el-message-box__btns {
    margin-top: 20px;
  }
  /deep/ .el-message-box__message {
    text-align: left;
  }
  /deep/ .el-message-box__btns {
    // text-align: center;
    margin-bottom: 24px;
  }
  /deep/ .leftbtn {
    margin-right: 46px;
    background-color: #d7d7d7;
    border-color: transparent;
  }
  /deep/ .cancelSureL {
    // text-align: center;
    display: none;
  }
  /deep/ .sureL {
    float: right;
  }
}
.contents {
  .is-plain {
    color: #dad7d7;
  }
  .is-plain:hover {
    color: #dad7d7;
  }
}

.el-table__row {
  /deep/ .is-disabled {
    border-color: transparent !important;
  }
}
</style>