USE `med_2021`;

INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('52', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '疾病集合', '308', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('53', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '药品通用名集合', '309', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('54', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '药品剂型集合', '310', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('55', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '症状集合', '311', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('56', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '体格检查项目集合', '312', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('57', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '体格检查结果集合', '313', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('58', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '手术和操作集合', '314', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('59', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '实验室检查套餐集合', '315', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('60', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '辅助检查项目集合', '316', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('61', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '辅助检查子项目集合', '317', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('62', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '辅助检查描述集合', '318', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('63', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '辅助检查结果集合', '319', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('64', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '麻醉集合', '320', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('65', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '科室集合', '321', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('66', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '食物集合', '322', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('67', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '其他过敏原集合', '323', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('68', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '医疗器械及物品集合', '324', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('69', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '部位集合', '325', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('70', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '中医疾病集合', '326', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('71', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '中医证候集合', '327', '0', '0', '0', '');
INSERT INTO `kl_lexicon` (`id`, `is_deleted`, `gmt_create`, `gmt_modified`, `creator`, `modifier`, `name`, `code`, `is_has_common`, `only_one`, `can_change`, `remark`) VALUES ('72', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '诱因集合', '328', '0', '0', '0', '');
