/*
Navicat MySQL Data Transfer

Source Server         : 192.168.2.236
Source Server Version : 50731
Source Host           : 192.168.2.236:3306
Source Database       : cdss

Target Server Type    : MYSQL
Target Server Version : 50731
File Encoding         : 65001

Date: 2020-12-03 16:11:15
*/
use `cdss`;
SET FOREIGN_KEY_CHECKS=0;
/*
Navicat MySQL Data Transfer

Source Server         : 192.168.2.236
Source Server Version : 50731
Source Host           : 192.168.2.236:3306
Source Database       : cdss

Target Server Type    : MYSQL
Target Server Version : 50731
File Encoding         : 65001

Date: 2020-12-09 14:01:53
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for sys_regular_config
-- ----------------------------
DROP TABLE IF EXISTS `sys_regular_config`;
CREATE TABLE `sys_regular_config` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `is_deleted` char(1) NOT NULL DEFAULT 'N' COMMENT '是否删除,N:未删除，Y:删除',
  `gmt_create` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录修改时间,如果时间是1970年则表示纪录未修改',
  `creator` varchar(20) NOT NULL DEFAULT '0' COMMENT '创建人，0表示无创建人值',
  `modifier` varchar(20) NOT NULL DEFAULT '0' COMMENT '修改人,如果为0则表示纪录未修改',
  `stand_name` varchar(255) DEFAULT NULL COMMENT '标准名',
  `rules_code` varchar(255) DEFAULT NULL COMMENT '正则编码',
  `rules_name` varchar(255) DEFAULT NULL COMMENT '正则名称',
  `rules_tepy` int(11) DEFAULT NULL COMMENT '正则类型',
  `rules_value` varchar(255) DEFAULT NULL COMMENT '正则式',
  `remark` varchar(255) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=90 DEFAULT CHARSET=utf8 COMMENT='正则表';

-- ----------------------------
-- Records of sys_regular_config
-- ----------------------------
INSERT INTO `sys_regular_config` VALUES ('1', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '钾测定', 'JCD', '钾测定', '1', '(钾测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('2', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血小板计数', 'XXBJS', '血小板计数', '1', '(血小板)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('3', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血小板计数', 'XXBJS', '血小板计数', '1', '(血小板计数)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('4', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血小板计数', 'XXBJS', '血小板计数', '1', '(血小板数)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('5', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血浆凝血酶原时间测定(PT)', 'XJNXMYSJCE', '血浆凝血酶原时间测定(PT)', '1', '(血浆凝血酶原时间测定\\(PT\\))\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('6', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血浆凝血酶原时间测定(PT)', 'XJNXMYSJCE', '血浆凝血酶原时间测定(PT)', '1', '(血浆凝血酶原时间测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('7', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血浆凝血酶原时间测定(PT)', 'XJNXMYSJCE', '血浆凝血酶原时间测定(PT)', '1', '(凝血酶原时间)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('8', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血浆凝血酶原时间测定(PT)', 'XJNXMYSJCE', '血浆凝血酶原时间测定(PT)', '1', '(凝血酶原时间检测)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('9', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血浆凝血酶原时间测定(PT)', 'XJNXMYSJCE', '血浆凝血酶原时间测定(PT)', '1', '(凝血酶原)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('10', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '活化部分凝血活酶时间测定(APTT)', 'HHBFNXM', '活化部分凝血活酶时间测定(APTT)', '1', '(活化部分凝血活酶时间测定\\(APTT\\))\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('11', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '活化部分凝血活酶时间测定(APTT)', 'HHBFNXM', '活化部分凝血活酶时间测定(APTT)', '1', '(APTT)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('12', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '活化部分凝血活酶时间测定(APTT)', 'HHBFNXM', '活化部分凝血活酶时间测定(APTT)', '1', '(活化部分凝血活酶时间测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('13', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '活化部分凝血活酶时间测定(APTT)', 'HHBFNXM', '活化部分凝血活酶时间测定(APTT)', '1', '(活化部分凝血活酶时间)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('14', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '活化部分凝血活酶时间测定(APTT)', 'HHBFNXM', '活化部分凝血活酶时间测定(APTT)', '1', '(凝血活酶)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('15', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血氧饱和度(SAT)', 'XYBHD', '血氧饱和度(SAT)', '1', '(血氧饱和度\\(SAT\\))\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('16', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血氧饱和度(SAT)', 'XYBHD', '血氧饱和度(SAT)', '1', '(血氧饱和度)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('17', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血氧饱和度(SAT)', 'XYBHD', '血氧饱和度(SAT)', '1', '(SAT)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('18', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(血肌酐测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('19', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(血肌酐)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('20', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(肌酐)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('21', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(肌酐值)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('22', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(血肌酐值)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('23', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(Cr)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('24', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(Cre)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('26', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '血肌酐测定', 'XJGCD', '血肌酐测定', '1', '(scr)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('27', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '肾小球滤过率(GFR)测定', 'SXQGL', '肾小球滤过率(GFR)测定', '1', '(肾小球滤过率\\(GFR\\)测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('28', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '肾小球滤过率(GFR)测定', 'SXQGL', '肾小球滤过率(GFR)测定', '1', '(肾小球滤过率)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('29', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '肾小球滤过率(GFR)测定', 'SXQGL', '肾小球滤过率(GFR)测定', '1', '(GFR)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('30', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '钾测定', 'JCD', '钾测定', '1', '(钾离子)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('31', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '钾测定', 'JCD', '钾测定', '1', '(血清钾)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('32', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '钾测定', 'JCD', '钾测定', '1', '(血钾)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('33', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '国际标准化比值(INR)', 'GJBZH', '国际标准化比值(INR)', '1', '(国际标准化比值\\(INR\\))\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('34', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '国际标准化比值(INR)', 'GJBZH', '国际标准化比值(INR)', '1', '(国际标准化比值)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('36', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '国际标准化比值(INR)', 'GJBZH', '国际标准化比值(INR)', '1', '(国际标准化比值测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('37', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '国际标准化比值(INR)', 'GJBZH', '国际标准化比值(INR)', '1', '(国际标准化比值\\(INR\\)测定)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('38', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '国际标准化比值(INR)', 'GJBZH', '国际标准化比值(INR)', '1', '(inr)\\s*[(\\-|\\+)?\\d+(\\.\\d+)?$]+', null);
INSERT INTO `sys_regular_config` VALUES ('39', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '碘比醇', null, '碘比醇', '2', '(\\、碘比醇过敏)|(无碘比醇过敏)|(否认碘比醇过敏)￥(碘比醇过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('40', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '碘比醇', null, '碘剂', '2', '(\\、碘剂过敏)|(无碘剂过敏)|(否认碘剂过敏)￥(碘剂过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('41', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '碘比醇', null, '碘制剂', '2', '(\\、碘制剂过敏)|(无碘制剂过敏)|(否认碘制剂过敏)￥(碘制剂过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('42', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '碘比醇', null, '碘制品', '2', '(\\、碘制品过敏)|(无碘制品过敏)|(否认碘制品过敏)￥(碘制品过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('43', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '碘比醇', null, '碘类', '2', '(\\、碘类过敏)|(无碘类过敏)|(否认碘类过敏)￥(碘类过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('44', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '碘比醇', null, '碘化X射线', '2', '(\\、碘化X射线过敏)|(无碘化X射线过敏)|(否认碘化X射线过敏)￥(碘化X射线过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('45', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '六氟化硫微泡', null, '六氟化硫微泡', '2', '(\\、六氟化硫微泡过敏)|(无六氟化硫微泡过敏)|(否认六氟化硫微泡过敏)￥(六氟化硫微泡过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('46', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '六氟化硫微泡', null, '微泡剂', '2', '(\\、微泡剂过敏)|(无微泡剂过敏)|(否认微泡剂过敏)￥(微泡剂过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('47', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '六氟化硫微泡', null, '微泡造影剂', '2', '(\\、微泡造影剂过敏)|(无微泡造影剂过敏)|(否认微泡造影剂过敏)￥(微泡造影剂过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('48', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '钆贝葡胺', null, '钆贝葡胺', '2', '(\\、钆贝葡胺过敏)|(无钆贝葡胺过敏)|(否认钆贝葡胺过敏)￥(钆贝葡胺过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('49', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '钆贝葡胺', null, '钆对比剂', '2', '(\\、钆对比剂过敏)|(无钆对比剂过敏)|(否认钆对比剂过敏)￥(钆对比剂过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('50', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '利多卡因', null, '利多卡因', '2', '(\\、利多卡因过敏)|(无利多卡因过敏)|(否认利多卡因过敏)|(\\、盐酸利多卡因过敏)|(无盐酸利多卡因过敏)|(否认盐酸利多卡因过敏)|(盐酸利多卡因过敏)￥(利多卡因过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('51', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '利多卡因', null, '盐酸利多卡因', '2', '(\\、盐酸利多卡因过敏)|(无盐酸利多卡因过敏)|(否认盐酸利多卡因过敏)￥(盐酸利多卡因过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('52', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '丁卡因', null, '丁卡因', '2', '(\\、丁卡因过敏)|(无丁卡因过敏)|(否认丁卡因过敏)|(\\、盐酸丁卡因过敏)|(无盐酸丁卡因过敏)|(否认盐酸丁卡因过敏)|(盐酸丁卡因过敏)￥(丁卡因过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('53', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '丁卡因', null, '盐酸丁卡因', '2', '(\\、盐酸丁卡因过敏)|(无盐酸丁卡因过敏)|(否认盐酸丁卡因过敏)￥(盐酸丁卡因过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('54', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '丙泊酚', null, '丙泊酚', '2', '(\\、丙泊酚过敏)|(无丙泊酚过敏)|(否认丙泊酚过敏)￥(丙泊酚过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('55', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '丙泊酚', null, '双异丙酚', '2', '(\\、双异丙酚过敏)|(无双异丙酚过敏)|(否认双异丙酚过敏)￥(双异丙酚过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('56', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '丙泊酚', null, '异丙酚', '2', '(\\、异丙酚过敏)|(无异丙酚过敏)|(否认异丙酚过敏)￥(异丙酚过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('57', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '依托咪酯', null, '依托咪酯', '2', '(\\、依托咪酯过敏)|(无依托咪酯过敏)|(否认依托咪酯过敏)￥(依托咪酯过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('58', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '依托咪酯', null, '乙苄咪唑', '2', '(\\、乙苄咪唑过敏)|(无乙苄咪唑过敏)|(否认乙苄咪唑过敏)￥(乙苄咪唑过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('59', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '依托咪酯', null, '甲苄咪酯', '2', '(\\、甲苄咪酯过敏)|(无甲苄咪酯过敏)|(否认甲苄咪酯过敏)￥(甲苄咪酯过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('60', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '依托咪酯', null, '甲苄咪唑', '2', '(\\、甲苄咪唑过敏)|(无甲苄咪唑过敏)|(否认甲苄咪唑过敏)￥(甲苄咪唑过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('61', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '依托咪酯', null, '乙咪酯', '2', '(\\、乙咪酯过敏)|(无乙咪酯过敏)|(否认乙咪酯过敏)￥(乙咪酯过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('62', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '咪达唑仑', null, '咪达唑仑', '2', '(\\、咪达唑仑过敏)|(无咪达唑仑过敏)|(否认咪达唑仑过敏)￥(咪达唑仑过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('63', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '咪达唑仑', null, '咪唑安定', '2', '(\\、咪唑安定过敏)|(无咪唑安定过敏)|(否认咪唑安定过敏)￥(咪唑安定过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('64', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '咪达唑仑', null, '咪唑二氮卓', '2', '(\\、咪唑二氮卓过敏)|(无咪唑二氮卓过敏)|(否认咪唑二氮卓过敏)￥(咪唑二氮卓过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('65', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '罗库溴铵', null, '罗库溴铵', '2', '(\\、罗库溴铵过敏)|(无罗库溴铵过敏)|(否认罗库溴铵过敏)￥(罗库溴铵过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('66', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '罗库溴铵', null, '爱可松', '2', '(\\、爱可松过敏)|(无爱可松过敏)|(否认爱可松过敏)￥(爱可松过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('67', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '罗库溴铵', null, '溴化物', '2', '(\\、溴化物过敏)|(无溴化物过敏)|(否认溴化物过敏)￥(溴化物过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('68', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '维库溴铵', null, '维库溴铵', '2', '(\\、维库溴铵过敏)|(无维库溴铵过敏)|(否认维库溴铵过敏)￥(维库溴铵过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('69', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '维库溴铵', null, '溴化凡寇罗宁', '2', '(\\、溴化凡寇罗宁过敏)|(无溴化凡寇罗宁过敏)|(否认溴化凡寇罗宁过敏)￥(溴化凡寇罗宁过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('70', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '复方苯海拉明', null, '复方苯海拉明', '2', '(\\、复方苯海拉明过敏)|(无复方苯海拉明过敏)|(否认复方苯海拉明过敏)￥(复方苯海拉明过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('71', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '复方苯海拉明', null, '抗组胺', '2', '(\\、抗组胺过敏)|(无抗组胺过敏)|(否认抗组胺过敏)￥(抗组胺过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('72', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '复方苯海拉明', null, '抗组织胺', '2', '(\\、抗组织胺过敏)|(无抗组织胺过敏)|(否认抗组织胺过敏)￥(抗组织胺过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('73', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '新斯的明', null, '新斯的明', '2', '(\\、新斯的明过敏)|(无新斯的明过敏)|(否认新斯的明过敏)￥(新斯的明过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('74', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '新斯的明', null, '醋甲胆碱', '2', '(\\、醋甲胆碱过敏)|(无醋甲胆碱过敏)|(否认醋甲胆碱过敏)￥(醋甲胆碱过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('75', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '新斯的明', null, '乙酰甲胆碱', '2', '(\\、乙酰甲胆碱过敏)|(无乙酰甲胆碱过敏)|(否认乙酰甲胆碱过敏)￥(乙酰甲胆碱过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('76', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '新斯的明', null, '乙酰胆碱', '2', '(\\、乙酰胆碱过敏)|(无乙酰胆碱过敏)|(否认乙酰胆碱过敏)￥(乙酰胆碱过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('77', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '腺苷', null, '腺苷', '2', '(\\、腺苷过敏)|(无腺苷过敏)|(否认腺苷过敏)￥(腺苷过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('78', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '腺苷', null, '腺苷酸', '2', '(\\、腺苷酸过敏)|(无腺苷酸过敏)|(否认腺苷酸过敏)￥(腺苷酸过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('79', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '孟鲁司特', null, '孟鲁司特', '2', '(\\、孟鲁司特过敏)|(无孟鲁司特过敏)|(否认孟鲁司特过敏)￥(孟鲁司特过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('80', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '孟鲁司特', null, '白三烯', '2', '(\\、白三烯过敏)|(无白三烯过敏)|(否认白三烯过敏)￥(白三烯过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('81', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '尘螨', null, '尘螨', '2', '(\\、尘螨过敏)|(无尘螨过敏)|(否认尘螨过敏)￥(尘螨过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('82', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '尘螨', null, '灰尘', '2', '(\\、灰尘过敏)|(无灰尘过敏)|(否认灰尘过敏)￥(灰尘过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('83', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '尘螨', null, '尘螨类', '2', '(\\、尘螨类过敏)|(无尘螨类过敏)|(否认尘螨类过敏)￥(尘螨类过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('84', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '花粉', null, '花粉', '2', '(\\、花粉过敏)|(无花粉过敏)|(否认花粉过敏)￥(花粉过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('85', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '花粉', null, '花朵', '2', '(\\、花朵过敏)|(无花朵过敏)|(否认花朵过敏)￥(花朵过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('86', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '花粉', null, '花粉性', '2', '(\\、花粉性过敏)|(无花粉性过敏)|(否认花粉性过敏)￥(花粉性过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('87', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '花粉', null, '花粉类', '2', '(\\、花粉类过敏)|(无花粉类过敏)|(否认花粉类过敏)￥(花粉类过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('88', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '动物皮毛', null, '动物皮毛', '2', '(\\、动物皮毛过敏)|(无动物皮毛过敏)|(否认动物皮毛过敏)￥(动物皮毛过敏)', null);
INSERT INTO `sys_regular_config` VALUES ('89', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '动物皮毛', null, '皮毛', '2', '(\\、皮毛过敏)|(无皮毛过敏)|(否认皮毛过敏)|(\\、动物皮毛过敏)|(无动物皮毛过敏)|(否认动物皮毛过敏)|(动物皮毛过敏)￥(皮毛过敏)', null);
