use `sys-tran`;
-- INSERT INTO `sys-tran`.`tran_sys_set` (`hospital_code`, `plan`, `sys_type`, `name`, `code`, `value`, `remark`) VALUES ('A001', '0', '11', '是否同时对接预问诊', 'connect_prec', '1', '是否同时对接预问诊（0-不对接，1-对接）');

insert into `tran_sys_set` ( `hospital_code`, `plan`, `sys_type`, `name`, `code`, `value`, `remark`) values('A001','0','16','医学知识','knowledge_show','1','是否显示（1是，0否）');
insert into `tran_sys_set` (`hospital_code`, `plan`, `sys_type`, `name`, `code`, `value`, `remark`) values('A001','0','16','医学知识','knowledge_no','9','显示顺序');
insert into `tran_sys_set` (`hospital_code`, `plan`, `sys_type`, `name`, `code`, `value`, `remark`) values('A001','0','16','全部量表','scale_show','1','是否显示（1是，0否）');
insert into `tran_sys_set` (`hospital_code`, `plan`, `sys_type`, `name`, `code`, `value`, `remark`) values('A001','0','16','全部量表','scale_no','10','显示顺序');