
CREATE DATABASE  `sys-diagbotman` DEFAULT CHARACTER SET utf8 COLLATE utf8_general_ci;

use `sys-diagbotman`;

/*
Navicat MySQL Data Transfer

Source Server         : SSSS
Source Server Version : 50717
Source Host           : localhost:3306
Source Database       : sys-log

Target Server Type    : MYSQL
Target Server Version : 50717
File Encoding         : 65001

Date: 2017-07-13 09:10:09
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for sys_log
-- ----------------------------
DROP TABLE IF EXISTS `sys_log`;
CREATE TABLE `sys_log` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '日志ID',
  `is_deleted` char(1) NOT NULL DEFAULT 'N' COMMENT '是否删除,N:未删除，Y:删除',
  `gmt_create` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录修改时间,如果时间是1970年则表示纪录未修改',
  `creator` varchar(20) NOT NULL DEFAULT '0' COMMENT '创建人，0表示无创建人值',
  `modifier` varchar(20) NOT NULL DEFAULT '0' COMMENT '修改人,如果为0则表示纪录未修改',
  `ip` varchar(255) NOT NULL DEFAULT '' COMMENT '访问者的IP',
  `method` varchar(255) NOT NULL DEFAULT '' COMMENT '方法',
  `operation` varchar(255) NOT NULL DEFAULT '' COMMENT '操作名',
  `params` varchar(255) NOT NULL DEFAULT '' COMMENT '参数',
  `username` varchar(255) NOT NULL DEFAULT '' COMMENT '用户名',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=267 DEFAULT CHARSET=utf8 COMMENT='系统操作日志表';


DROP TABLE IF EXISTS `diag_service_filter`;
CREATE TABLE `diag_service_filter` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `is_deleted` char(1) NOT NULL DEFAULT 'N' COMMENT '是否删除,N:未删除，Y:删除',
  `gmt_create` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录修改时间,如果时间是1970年则表示纪录未修改',
  `creator` varchar(20) NOT NULL DEFAULT '0' COMMENT '创建人，0表示无创建人值',
  `modifier` varchar(20) NOT NULL DEFAULT '0' COMMENT '修改人,如果为0则表示纪录未修改',
  `name` varchar(255) NOT NULL DEFAULT '' COMMENT '名称',
  `product_id` bigint(20) NOT NULL DEFAULT 0 COMMENT '产品id',
  `remark` varchar(255) NOT NULL DEFAULT '' COMMENT '备注',
  PRIMARY KEY (`id`),
  UNIQUE KEY `name` (`name`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8 COMMENT='产品网关过滤(需要使用appkey和secret的url地址)';