use `sys-icss`;

ALTER TABLE `icss_question_info`
ADD COLUMN `sel_flag` tinyint(4) NOT NULL DEFAULT '0' COMMENT '开启默认选中标记(0：不开启，1：开启)' AFTER `spec_flag`;