use `med`;
/*
Navicat MySQL Data Transfer

Source Server         : 192.168.2.236
Source Server Version : 50725
Source Host           : 192.168.2.236:3306
Source Database       : med

Target Server Type    : MYSQL
Target Server Version : 50725
File Encoding         : 65001

Date: 2020-05-12 09:43:55
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for kl_push_set
-- ----------------------------
DROP TABLE IF EXISTS `kl_push_set`;
CREATE TABLE `kl_push_set` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `is_deleted` char(1) NOT NULL DEFAULT 'N' COMMENT '是否删除,N:未删除，Y:删除',
  `gmt_create` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT '1970-01-01 12:00:00' COMMENT '记录修改时间,如果时间是1970年则表示纪录未修改',
  `creator` varchar(20) NOT NULL DEFAULT '0' COMMENT '创建人，0表示无创建人值',
  `modifier` varchar(20) NOT NULL DEFAULT '0' COMMENT '修改人,如果为0则表示纪录未修改',
  `mode` int(11) NOT NULL DEFAULT '0' COMMENT '推理模式',
  `name` varchar(100) DEFAULT NULL COMMENT '配置名称',
  `code` varchar(100) DEFAULT NULL COMMENT '配置编码',
  `value` varchar(255) DEFAULT NULL,
  `remark` varchar(128) DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=136 DEFAULT CHARSET=utf8 COMMENT='推理设置';

-- ----------------------------
-- Records of kl_push_set
-- ----------------------------
-- ----------------------------
-- Records of kl_push_set
-- ----------------------------
INSERT INTO `kl_push_set` VALUES ('1', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '1', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('2', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '1', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('3', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '1', '常见症状', 'comsympto_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('4', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '1', '常见症状', 'comsympto_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('7', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '2', '常见症状', 'comsympto_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('8', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '2', '常见症状', 'comsympto_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('11', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '3', '常见症状', 'comsympto_show', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('12', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '3', '常见症状', 'comsympto_no', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('27', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '症状推送', 'symptoms_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('28', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('29', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '症状推送', 'symptoms_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('30', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('31', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('32', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '诊断推送', 'diapush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('33', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '检验检查推送', 'Inspush_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('34', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('35', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('36', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '病历书写规范提示', 'specification_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('37', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('38', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '症状推送', 'symptoms_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('39', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '症状推送', 'symptoms_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('40', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '4', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('41', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '诊断推送', 'diapush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('42', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('43', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '检验检查推送', 'Inspush_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('44', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('45', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('46', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '5', '病历书写规范提示', 'specification_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('47', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '检验检查推送', 'Inspush_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('48', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('49', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '病历书写规范提示', 'specification_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('50', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('51', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '其他史推送', 'otherpush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('52', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '其他史推送', 'otherpush_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('53', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('54', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '诊断推送', 'diapush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('55', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('56', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '6', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('57', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('58', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '诊断推送', 'diapush_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('59', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '体格检查推送', 'physical_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('60', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '体格检查推送', 'physical_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('61', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('62', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('63', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('64', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '病历书写规范提示', 'specification_no', '6', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('65', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('66', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '检验检查推送', 'Inspush_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('67', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '评估量表推送', 'evaluation_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('68', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '7', '评估量表推送', 'evaluation_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('69', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('70', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('71', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('72', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '诊断推送', 'diapush_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('73', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('74', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '检验检查推送', 'Inspush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('75', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('76', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '病历书写规范提示', 'specification_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('77', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '相似病例推送', 'similarcases_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('78', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '8', '相似病例推送', 'similarcases_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('79', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('80', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('81', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('82', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '诊断推送', 'diapush_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('83', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('84', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '检验检查推送', 'Inspush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('85', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('86', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '病历书写规范提示', 'specification_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('87', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '相似病例推送', 'similarcases_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('88', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '10', '相似病例推送', 'similarcases_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('89', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('90', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('91', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('92', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '诊断推送', 'diapush_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('93', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('94', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '检验检查推送', 'Inspush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('95', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('96', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '病历书写规范提示', 'specification_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('97', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '相似病例推送', 'similarcases_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('98', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '11', '相似病例推送', 'similarcases_no', '5', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('126', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '病情提示', 'illness_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('127', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '病情提示', 'illness_no', '1', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('129', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '诊断推送', 'diapush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('130', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '诊断推送', 'diapush_no', '2', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('131', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '检验检查推送', 'Inspush_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('132', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '检验检查推送', 'Inspush_no', '3', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('133', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '病历书写规范提示', 'specification_show', '1', '是否显示（1是，0否）');
INSERT INTO `kl_push_set` VALUES ('134', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '病历书写规范提示', 'specification_no', '4', '显示顺序');
INSERT INTO `kl_push_set` VALUES ('135', 'N', '1970-01-01 12:00:00', '1970-01-01 12:00:00', '0', '0', '9', '相似病例推送', 'similarcases_show', '1', '是否显示（1是，0否）');
