-- ----------------------------
-- 1.修改`dc_blockloss_result`表-丢失原因字段长度为256
-- ----------------------------
ALTER TABLE `dc_blockloss_result` MODIFY COLUMN `loss_cause` varchar(256)  DEFAULT NULL COMMENT '丢失原因';
-- ----------------------------
-- 2.修改`dc_regular_info`表-描述字段 为选填
-- ----------------------------
ALTER TABLE `dc_regular_info` MODIFY COLUMN `description` varchar(512) DEFAULT NULL COMMENT '描述';
-- ----------------------------
-- 3.修改`dc_column_result`表-新增入院日期字段
-- ----------------------------
ALTER TABLE `dc_column_result`
ADD COLUMN `behospital_date`  datetime NULL DEFAULT NULL COMMENT '入院日期' AFTER `description`;
-- ----------------------------
-- 4.修改 `dc_nonnull_result`表-新增入院日期字段
-- ----------------------------
ALTER TABLE `dc_nonnull_result`
ADD COLUMN `behospital_date`  datetime NULL DEFAULT NULL COMMENT '入院日期' AFTER `description`;
-- ----------------------------
-- 5.修改`dc_standardvalue_result`表-新增入院日期字段
-- ----------------------------
ALTER TABLE `dc_standardvalue_result`
ADD COLUMN `behospital_date`  datetime NULL DEFAULT NULL COMMENT '入院日期' AFTER `description`;
-- ----------------------------
-- 6.修改`dc_regular_result`表-新增入院日期字段
-- ----------------------------
ALTER TABLE `dc_regular_result`
ADD COLUMN `behospital_date`  datetime NULL DEFAULT NULL COMMENT '入院日期' AFTER `description`;
