use `qc`;

-- 默认列设置
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'behospitalCode';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'mrTime';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'chTime';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'sex';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'age';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'bedCode';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'placefileDate';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'behDoctorName';
UPDATE sys_user_pageset SET `status` = 0 WHERE user_id =- 1 AND val = 'directorDoctorName';